.vc_custom_1612909203387{background-image: url(http://quickframes.miritin.com/wordpress/wp-content/uploads/2021/02/lp-hero-hvac.jpg?id=3840) !important;}.vc_custom_1612910822265{margin: 70px !important;padding: 20px !important;border: 20px initial !important;}.vc_custom_1612901162313{background-color: #ededed !important;}.vc_custom_1612903404198{padding-top: 35px !important;padding-bottom: 32px !important;background-color: #e5c702 !important;}.vc_custom_1507708598258{padding-top: 6px !important;}.vc_custom_1612902162759{margin-bottom: 0px !important;padding-bottom: 0px !important;}.vc_custom_1612890417096{margin-bottom: 0px !important;}