[vc_row css=".vc_custom_1613674045164{margin-top: -70px !important;}"][vc_column][induzy_vc_section_title title="What Are QuickFrames?" text_align="left"][/induzy_vc_section_title][/vc_column][/vc_row][vc_row css=".vc_custom_1613605203953{margin-top: -100px !important;}"][vc_column][induzy_vc_section_title title_head="h2" title="We're Glad You Asked" sep_type="border"][/induzy_vc_section_title][vc_row_inner][vc_column_inner width="2/6"][vc_single_image image="4020" img_size="220x270" alignment="center" style="vc_box_shadow_border"][/vc_column_inner][vc_column_inner width="3/6"][induzy_vc_section_title title_head="h4" title="Traditional..."]...welded angle iron or channel framing for roof and floor supports haven’t changed in many decades yet building design and construction processes have. The need to respond to last-minute changes has never been greater, yet angle iron and channel framing remains inflexible,  expensive, and untimely when changes occur. Welding within improved spaces is also a fire hazard and welding gases can be dangerous to workers over prolonged periods of time.[/induzy_vc_section_title][/vc_column_inner][/vc_row_inner][vc_row_inner][vc_column_inner width="3/6"][induzy_vc_section_title title_head="h4" title="At QuickFrames..."]<span style="font-weight: 400;">...we've reinvented roof and floor support frames – making adaptability to change central to all our framing systems.  Our frame rails adjust in-the-field to as-built building conditions, they can be easily installed after deck is down, and can be resized or relocated after installation.  </span>

<span style="font-weight: 400;">Our frame components are manufactured in high volumes on precision tooling to ensure consistent quality (unlike hand-fabricated like angle-iron framing) allowing us to respond quickly to last-minute jobsite changes.  We'll even overnight frames when needed.  U</span><span style="font-weight: 400;">sing one of the QuickFrames bolted or screwed connectors eliminates the need to weld inside of buildings, and especially in enclosed spaces, making the workplace safer for all.</span>

<span style="font-weight: 400;">These design criteria – <strong>adjustability, quality, timeliness, and safety</strong> - are the building blocks for all QuickFrames Systems.</span>[/induzy_vc_section_title][/vc_column_inner][vc_column_inner width="2/6"][vc_single_image image="3865" img_size="large" style="vc_box_shadow_border"][/vc_column_inner][/vc_row_inner][/vc_column][/vc_row][vc_row css=".vc_custom_1613023083552{margin-top: -100px !important;}"][vc_column][induzy_vc_section_title title_head="h2" title="Our Systems" text_align="left" sep_type="border"][/induzy_vc_section_title][vc_row_inner css=".vc_custom_1613021480994{margin-bottom: -100px !important;}"][vc_column_inner width="1/3"][induzy_vc_section_title title_head="h2" title="Adjustable Frames" text_align="center"]
<p style="text-align: left;"><span style="font-weight: 400;">With frame rails that telescope and adjust to size in the field, our flagship line of adjustable frames is perfect for supporting roof top HVAC units, coolers, fans, and other mechanical equipment which are most susceptible to change during construction.  They are also perfect for remodeling and TI projects where the roof or floor deck is installed already and/or welding is either prohibited by flammable nearby materials or expensive due to fire protection for existing infrastructure.</span></p>
<img class="alignnone size-full wp-image-4068" src="http://quickframes.miritin.com/wordpress/wp-content/uploads/2021/02/Adjustable-Rails.gif" alt="" width="502" height="203" />[/induzy_vc_section_title][/vc_column_inner][vc_column_inner width="1/3"][induzy_vc_section_title title_head="h2" title="Cut-to-length Frames" text_align="center"]
<p style="text-align: left;"><span style="font-weight: 400;">There are times when you need a frame instantly and can’t wait for QuickFrames to ship (even overnight) a frame to you.  Our cut-to-length frames are designed to be measured and cut to length in the field yet still retain some adjustable characteristics.  Keep a few in stock for those last minute emergencies.</span></p>
<img class="alignnone size-full wp-image-4069" src="http://quickframes.miritin.com/wordpress/wp-content/uploads/2021/02/Cut-To-Length-Rails.gif" alt="" width="502" height="203" />[/induzy_vc_section_title][/vc_column_inner][vc_column_inner width="1/3"][induzy_vc_section_title title_head="h2" title="Drop-in Frames" text_align="center"]
<p style="text-align: left;"><span style="font-weight: 400;">Available for new builds only, QuickFrames can fully assemble your frames so you drop them in just like angle iron frames using one of our weldable or side-bolted connectors.  What’s the advantage, then, of using QuickFrames?  Our drop-in frames are still adjustable in-field should locations, measurements and/or equipment sizes change.  If a drop-in frame is installed and later needs to be moved, simply detach the rail system, attached new bolt-in connectors, and install the frame in a different location.</span></p>
<img class="alignnone size-full wp-image-4070" src="http://quickframes.miritin.com/wordpress/wp-content/uploads/2021/02/Drop-in-Frames.gif" alt="" width="502" height="203" />
<h4 style="text-align: center;">Want more details on our frame components?</h4>
[/vc_column_text][vc_btn title="Click Here to Learn More" style="flat" color="info" size="lg" align="center" link="url:https%3A%2F%2Fquickframes.miritin.com%2Fwordpress%2Fdetails%2F"][/vc_column][/vc_row]