[vc_row][vc_column][vc_row_inner][vc_column_inner offset="vc_col-lg-4 vc_col-md-4"][induzy_vc_feature_box title="RTUs" title_head="h4" fbox_image="673" btn_text="Read More" btn_type="link" feature_layout="1" fbox_items="{``Enabled``:{``title``:``Title``,``content``:``Content``},``disabled``:{``icon``:``Icon``,``video``:``Video``,``image``:``Image``,``btn``:``Button``}}"]Commercial buildings have unique, and often extensive, needs for their HVAC systems. Whether you use Trane, Carrier or another brand, you’re going to need support for these roof top units (RTUs). A roof top unit and its curb are heavy and require structural support. Fortunately, that’s why QuickFrames is here.

In fact, a structural frame is required for roof openings in a commercial building of more than 12 inches. This helps support the opening and the unit. Curbs and opening sizes for RTUs exceed this cut size, and therefore require a roof top unit support frame for each one.[/induzy_vc_feature_box][induzy_vc_feature_box title="HVAC" title_head="h4" fbox_image="679" btn_text="Read More" btn_type="link" feature_layout="1" fbox_items="{``Enabled``:{``title``:``Title``,``content``:``Content``},``disabled``:{``icon``:``Icon``,``video``:``Video``,``image``:``Image``,``btn``:``Button``}}"]desc.[/induzy_vc_feature_box][/vc_column_inner][vc_column_inner offset="vc_col-lg-4 vc_col-md-4"][induzy_vc_feature_box title="SKYLIGHTS &amp; ROOF HATCHES" title_head="h4" fbox_image="677" btn_text="Read More" btn_type="link" feature_layout="1" fbox_items="{``Enabled``:{``title``:``Title``,``content``:``Content``},``disabled``:{``icon``:``Icon``,``video``:``Video``,``image``:``Image``,``btn``:``Button``}}"]desc.[/induzy_vc_feature_box][induzy_vc_feature_box title="EXHAUST FANS &amp; VENTS" title_head="h4" fbox_image="680" btn_text="Read More" btn_type="link" feature_layout="1" fbox_items="{``Enabled``:{``title``:``Title``,``content``:``Content``},``disabled``:{``icon``:``Icon``,``video``:``Video``,``image``:``Image``,``btn``:``Button``}}"]desc.[/induzy_vc_feature_box][induzy_vc_feature_box title="CURB SUPPORTS" title_head="h4" fbox_image="680" btn_text="Read More" btn_type="link" feature_layout="1" fbox_items="{``Enabled``:{``title``:``Title``,``content``:``Content``},``disabled``:{``icon``:``Icon``,``video``:``Video``,``image``:``Image``,``btn``:``Button``}}"]desc.[/induzy_vc_feature_box][/vc_column_inner][vc_column_inner offset="vc_col-lg-4 vc_col-md-4"][induzy_vc_feature_box title="ROOF DRAINS" title_head="h4" fbox_image="678" btn_text="Read More" btn_type="link" feature_layout="1" fbox_items="{``Enabled``:{``title``:``Title``,``content``:``Content``},``disabled``:{``icon``:``Icon``,``video``:``Video``,``image``:``Image``,``btn``:``Button``}}"]desc.[/induzy_vc_feature_box][induzy_vc_feature_box title="FLOOR OPENINGS" title_head="h4" fbox_image="681" btn_text="Read More" btn_type="link" feature_layout="1" fbox_items="{``Enabled``:{``title``:``Title``,``content``:``Content``},``disabled``:{``icon``:``Icon``,``video``:``Video``,``image``:``Image``,``btn``:``Button``}}"]desc.[/induzy_vc_feature_box][/vc_column_inner][/vc_row_inner][/vc_column][/vc_row][vc_row][vc_column width="1/2"][vc_single_image image="3497" img_size="full" alignment="center"][vc_column_text][/vc_column_text][/vc_column][vc_column width="1/2"][vc_column_text]
<h2>When you use QuickFrames as the rooftop equipment supports for your HVAC units, you get a host of benefits, including:
● Quick and painless bolt-on installation, with no welding required (all you need is a ¾” impact driver).
● The ability to install the frames from under the deck.
● Ironclad engineering: Our frames are pre-engineered for a variety of applications. Additionally, we offer site-specific engineering when needed at no extra cost.
● In-field adjustability in both axes to accommodate variations in as-built conditions.
● Ready when you are, with most sizes of QuickFrames available for next-day shipment.</h2>
[/vc_column_text][/vc_column][/vc_row][vc_row full_width="stretch_row" css=".vc_custom_1507967716873{padding-top: 35px !important;padding-bottom: 32px !important;background-color: #ffc811 !important;}" el_class="additional-call-to-action"][vc_column][vc_row_inner][vc_column_inner offset="vc_col-lg-9 vc_col-md-12"][induzy_vc_feature_box title="Do You Still Have A Question Regarding Our Services?" title_head="h4" layout="list" icon_size="30" icon_type="fontawesome" icon_fontawesome="fa fa-phone" icon_variation="c" icon_style="rounded-circle" border_size="2" feature_layout="1" css=".vc_custom_1605822390704{margin-bottom: 0px !important;padding-bottom: 0px !important;}" font_color="#000000" border_color="#000000"]There are many variations of passages of Lorem Ipsum available, but the majority have suffered alteration.[/induzy_vc_feature_box][/vc_column_inner][vc_column_inner css=".vc_custom_1507708598258{padding-top: 6px !important;}" offset="vc_col-lg-3 vc_col-md-12"][vc_btn title="Get a Quote" style="custom" custom_background="#000000" custom_text="#ffffff" shape="square" align="right" link="url:http%3A%2F%2Fdemo.zozothemes.com%2Finduzy%2Fcontact-us%2F|||" el_class="additional-btn" css=".vc_custom_1510223378363{margin-bottom: 0px !important;}"][/vc_column_inner][/vc_row_inner][/vc_column][/vc_row]